-- phpMyAdmin SQL Dump
-- version 5.1.1
-- https://www.phpmyadmin.net/
--
-- Hôte : 127.0.0.1:3305
-- Généré le : lun. 16 mai 2022 à 09:13
-- Version du serveur : 5.7.36
-- Version de PHP : 7.4.26

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Base de données : `my_db`
--

-- --------------------------------------------------------

--
-- Structure de la table `extraction`
--

DROP TABLE IF EXISTS `extraction`;
CREATE TABLE IF NOT EXISTS `extraction` (
  `id_record` int(10) NOT NULL AUTO_INCREMENT,
  `name_first` varchar(35) COLLATE utf8mb4_bin NOT NULL,
  `name_last` varchar(35) COLLATE utf8mb4_bin NOT NULL,
  `address` varchar(50) COLLATE utf8mb4_bin DEFAULT NULL,
  `email` varchar(45) COLLATE utf8mb4_bin DEFAULT NULL,
  `dob` date NOT NULL,
  PRIMARY KEY (`id_record`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8mb4 COLLATE=utf8mb4_bin;
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
