-- phpMyAdmin SQL Dump
-- version 4.7.4
-- https://www.phpmyadmin.net/
--
-- Hôte : localhost:3306
-- Généré le :  mar. 28 août 2018 à 08:08
-- Version du serveur :  5.7.20-log
-- Version de PHP :  5.6.31

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET AUTOCOMMIT = 0;
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Base de données :  `tests`
--

-- --------------------------------------------------------

--
-- Structure de la table `kk`
--

DROP TABLE IF EXISTS `kk`;
CREATE TABLE IF NOT EXISTS `kk` (
  `id` int(10) NOT NULL AUTO_INCREMENT,
  `designation` varchar(10) NOT NULL,
  `pu` varchar(10) NOT NULL,
  PRIMARY KEY (`id`)
) ENGINE=InnoDB AUTO_INCREMENT=6 DEFAULT CHARSET=utf8;

--
-- Déchargement des données de la table `kk`
--

INSERT INTO `kk` (`id`, `designation`, `pu`) VALUES
(1, 'stylo1', '25'),
(2, 'stylo2', '50'),
(3, 'stylo3', '75'),
(4, 'stylo4', '100'),
(5, 'stylo5', '125');
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
