-- phpMyAdmin SQL Dump
-- version 4.7.4
-- https://www.phpmyadmin.net/
--
-- Host: 127.0.0.1:3306
-- Generation Time: Feb 14, 2018 at 11:40 AM
-- Server version: 5.7.19
-- PHP Version: 5.6.31

SET SQL_MODE = "NO_AUTO_VALUE_ON_ZERO";
SET AUTOCOMMIT = 0;
START TRANSACTION;
SET time_zone = "+00:00";


/*!40101 SET @OLD_CHARACTER_SET_CLIENT=@@CHARACTER_SET_CLIENT */;
/*!40101 SET @OLD_CHARACTER_SET_RESULTS=@@CHARACTER_SET_RESULTS */;
/*!40101 SET @OLD_COLLATION_CONNECTION=@@COLLATION_CONNECTION */;
/*!40101 SET NAMES utf8mb4 */;

--
-- Database: `eclairage`
--

-- --------------------------------------------------------

--
-- Table structure for table `eclairage`
--

DROP TABLE IF EXISTS `eclairage`;
CREATE TABLE IF NOT EXISTS `eclairage` (
  `ID` int(1) NOT NULL AUTO_INCREMENT,
  `capteurmouvement` int(1) NOT NULL,
  `capteurlumiere` int(100) NOT NULL,
  PRIMARY KEY (`ID`)
) ENGINE=MyISAM AUTO_INCREMENT=20 DEFAULT CHARSET=latin1;

--
-- Dumping data for table `eclairage`
--

INSERT INTO `eclairage` (`ID`, `capteurmouvement`, `capteurlumiere`) VALUES
(1, 1, 0),
(12, 0, 100),
(13, 1, 0),
(14, 0, 100),
(15, 1, 0),
(16, 0, 100),
(17, 1, 0),
(18, 1, 100),
(19, 1, 0);
COMMIT;

/*!40101 SET CHARACTER_SET_CLIENT=@OLD_CHARACTER_SET_CLIENT */;
/*!40101 SET CHARACTER_SET_RESULTS=@OLD_CHARACTER_SET_RESULTS */;
/*!40101 SET COLLATION_CONNECTION=@OLD_COLLATION_CONNECTION */;
